LIBRARY      "Microsoft.Research.Dryad.DryadLinq.NativeWrapper.dll"

EXPORTS
    GetTotalLength
    GetExpectedLength
    GetVertexId
    GetNumOfInputs
    GetNumOfOutputs
    SetInitialSizeHint
    GetInputChannelURI
    GetOutputChannelURI
    Flush
    Close
    ReadDataBlock
    WriteDataBlock
    AllocateDataBlock
    ReleaseDataBlock
    EnableFifoInputChannel
    EnableFifoOutputChannel
